)^{-1} - baseline (rad φΔd assoc Nd DN 1

0

1

4% − 4% + _{10%−}^{13%+} _{5%−}^{5%+} scale unc.

ALICE^+, D*^+, D^0

Average D

c < 1 GeV/

assoc Tp 0.3 < c < 5 GeV/ D T p 3 <

| < 1 ηΔ | < 0.5, | cms Dy|

0

1

4% − 4% + _{11%−}^{14%+} _{5%−}^{5%+} scale unc.

= 5.02 TeV s pp,

= 7 TeV s pp,

= 13 TeV s pp, c < 1 GeV/

assoc Tp 0.3 < c < 16 GeV/ D T p 8 <

4% − 4% + _{5%−}^{5%+} scale unc.

c < 1 GeV/

assoc Tp 0.3 < c < 24 GeV/ D T p 16 < uncertainties

baseline-subtraction

(rad) φΔ 0 0.5 1 1.5 2 2.5 3

)^{-1} - baseline (rad φΔd assoc Nd DN 1

0.5 − 0 0.5 1 1.5

5% − 5% + _{5%−}^{5%+} scale unc.

c < 2 GeV/

assoc Tp 1 < c < 5 GeV/ D T p 3 <

(rad) φΔ 0 0.5 1 1.5 2 2.5 3 4% − 4% + _{4%−}^{4%+} scale unc.

c < 2 GeV/

assoc Tp 1 < c < 16 GeV/ D T p 8 <

(rad) φΔ 0 0.5 1 1.5 2 2.5 3 5% − 5% + _{4%−}^{4%+} scale unc.

c < 2 GeV/

assoc Tp 1 < c < 24 GeV/ D T p 16 <

ALI-PUB-527531

ALI-PUB-527531